-185^°

-180^°

-175^°

-170^°

-165^°

-160^°

-155^°

-150^°

10^°15^°20^°25^°30^°35^°40^°-185°-180°-175°-170°-165°-160°-155°-150°10°15°20°25°30°35°40°0.010.020.030.040.050.0amplitude (mm)3210Plate 13: The K1 tidal range (23.93 h)