-180^°

-175^°

-170^°

-165^°

-160^°

-155^°

-150^°

10^°15^°20^°25^°30^°35^°40^°450400400350350300300250200-180°-175°-170°-165°-160°-155°-150°10°15°20°25°30°35°40°200.0250.0300.0350.0400.0450.0depth (m)Plate 7: depth of the 10C isotherm